{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"NAME","type":"character","width":30},{"name":"ADDRESS1","type":"character","width":24},{"name":"ADDRESS2","type":"character","width":24},{"name":"ADDRESS3","type":"character","width":24},{"name":"PSWDMASTER","type":"character","width":12},{"name":"DATAPATH","type":"character","width":32},{"name":"DISTNAME","type":"character","width":30},{"name":"DISTADDR1","type":"character","width":30},{"name":"DISTADDR2","type":"character","width":30},{"name":"DISTADDR3","type":"character","width":30},{"name":"AHFILE","type":"character","width":12},{"name":"CLFILE","type":"character","width":12},{"name":"INSOPTFILE","type":"character","width":12},{"name":"LOGIC1","type":"logical","width":1},{"name":"LOGIC2","type":"logical","width":1},{"name":"LOGIC3","type":"logical","width":1},{"name":"LOGIC4","type":"logical","width":1},{"name":"LOGIC5","type":"logical","width":1},{"name":"LOGIC6","type":"logical","width":1},{"name":"LMDATAPATH","type":"character","width":48},{"name":"TXLIMIT8","type":"number","width":12,"decimals":2},{"name":"TXLIMIT18","type":"number","width":12,"decimals":2},{"name":"TXLIMITDT","type":"date","width":8}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["¡×åîòùµê\u0010\u001e\u001eâ\u001eCCZfYso?<n\u009c\u009a","P.O. Box 118826","Carrollton, TX 75011","214-394-4087",null,null,null,null,null,null,"ah_xx.dbf","cl_xx.dbf","insmenu.dbf",false,false,false,false,false,false,null,9800.00,1200.00,"1994-06-30"]